From 5222bf09320ebc1cd5da799970fcc0d2dd32bb3f Mon Sep 17 00:00:00 2001
From: Dan McGee <dan@archlinux.org>
Date: Sun, 21 Oct 2012 11:05:51 -0500
Subject: Use HTTPS links everywhere for Arch sites

The main site, wiki, and BBS are using HTTPS exclusively, so link
directly to the correct protocol rather than forcing a redirect.

Signed-off-by: Dan McGee <dan@archlinux.org>
Signed-off-by: Lukas Fleischer <archlinux@cryptocrack.de>
---
 support/schema/aur-schema.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'support/schema/aur-schema.sql')

diff --git a/support/schema/aur-schema.sql b/support/schema/aur-schema.sql
index 726fd2f..d55cf1a 100644
--- a/support/schema/aur-schema.sql
+++ b/support/schema/aur-schema.sql
@@ -97,7 +97,7 @@ CREATE TABLE Packages (
 	Version VARCHAR(32) NOT NULL DEFAULT '',
 	CategoryID TINYINT UNSIGNED NOT NULL DEFAULT 1,
 	Description VARCHAR(255) NOT NULL DEFAULT "An Arch Package",
-	URL VARCHAR(255) NOT NULL DEFAULT "http://www.archlinux.org",
+	URL VARCHAR(255) NOT NULL DEFAULT "https://www.archlinux.org",
 	License VARCHAR(40) NOT NULL DEFAULT '',
 	NumVotes INTEGER UNSIGNED NOT NULL DEFAULT 0,
 	OutOfDateTS BIGINT UNSIGNED NULL DEFAULT NULL,
-- 
cgit v1.2.3-54-g00ecf

